%This is the abstract template for the Spincurrent 2010. 
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\documentclass[a4paper,12pt]{article}
\setlength{\textwidth}{160mm}   
%\setlength{\textheight}{183mm} 
\setlength{\oddsidemargin}{0mm} 
\setlength{\evensidemargin}{0mm}
\setlength{\topmargin}{0mm}     
\setlength{\headheight}{0mm}    
\setlength{\headsep}{0mm}       
\setlength{\footskip}{0mm}      
\usepackage{graphicx}
\pagestyle{empty}
\begin{document}
\begin{center}{
\bf {\Large 
The Title of Your Abstract 
}}
\end{center}
\vspace{-6mm}
\begin{center}
{\bf 
\underbar{Taro Kinken}$^1$,
Hanako Tohoku$^1$ and Ichiro Sendai$^2$
}
\end{center}
\vspace{-7mm}
\begin{center}
{\bf 
$^1$Institute for Materials Research, Tohoku University, Sendai 980-8577, Japan\\
$^2$Department of Physics, Tohoku University, Sendai 980-8577, Japan 
}\\
\end{center}

\vspace{5mm}
%%%
{\large 
%%%


This sample provides the author with an example of the layout 
and style of an abstract. Abstracts should be written on the sheet 
of A4 size with the margin of more than 2cm for all sides~\cite{Taro10}. 



%%% figure 
\begin{figure}[hbt]
\begin{center}
%\scalebox{0.5}[0.5]{\includegraphics{figure.eps}}
\end{center}
\caption{Figure}
\end{figure}
%%% figure 

\begin{thebibliography}{99}
\bibitem{Taro10}
  Taro Kinken, Spincurrent {\bf 1}, 001002 (2010). 
\end{thebibliography}
%%%
}
%%%
\end{document}
